\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{1}{|r}|}
\hline
Assembly & E2348-69 \\ \hline
\# contigs ($\geq$ 0 bp) & 2442 \\ \hline
\# contigs ($\geq$ 1000 bp) & 156 \\ \hline
\# contigs ($\geq$ 5000 bp) & 74 \\ \hline
\# contigs ($\geq$ 10000 bp) & 64 \\ \hline
\# contigs ($\geq$ 25000 bp) & 47 \\ \hline
\# contigs ($\geq$ 50000 bp) & 26 \\ \hline
Total length ($\geq$ 0 bp) & 5791762 \\ \hline
Total length ($\geq$ 1000 bp) & 5047942 \\ \hline
Total length ($\geq$ 5000 bp) & 4913543 \\ \hline
Total length ($\geq$ 10000 bp) & 4845903 \\ \hline
Total length ($\geq$ 25000 bp) & 4552658 \\ \hline
Total length ($\geq$ 50000 bp) & 3757801 \\ \hline
\# contigs & 395 \\ \hline
Largest contig & 300313 \\ \hline
Total length & 5202412 \\ \hline
Reference length & 5046283 \\ \hline
GC (\%) & 50.52 \\ \hline
Reference GC (\%) & 50.52 \\ \hline
N50 & 135065 \\ \hline
NG50 & 135065 \\ \hline
N90 & 20674 \\ \hline
NG90 & 26342 \\ \hline
auN & 137006.7 \\ \hline
auNG & 141245.6 \\ \hline
L50 & 13 \\ \hline
LG50 & 13 \\ \hline
L90 & 53 \\ \hline
LG90 & 47 \\ \hline
\# misassemblies & 1 \\ \hline
\# misassembled contigs & 1 \\ \hline
Misassembled contigs length & 32395 \\ \hline
\# local misassemblies & 2 \\ \hline
\# scaffold gap ext. mis. & 0 \\ \hline
\# scaffold gap loc. mis. & 1 \\ \hline
\# unaligned mis. contigs & 0 \\ \hline
\# unaligned contigs & 303 + 1 part \\ \hline
Unaligned length & 278081 \\ \hline
Genome fraction (\%) & 97.577 \\ \hline
Duplication ratio & 1.000 \\ \hline
\# N's per 100 kbp & 6.21 \\ \hline
\# mismatches per 100 kbp & 1.18 \\ \hline
\# indels per 100 kbp & 0.24 \\ \hline
Largest alignment & 300313 \\ \hline
Total aligned length & 4924201 \\ \hline
NA50 & 135065 \\ \hline
NGA50 & 135065 \\ \hline
NA90 & 20674 \\ \hline
NGA90 & 26342 \\ \hline
auNA & 136859.7 \\ \hline
auNGA & 141094.0 \\ \hline
LA50 & 13 \\ \hline
LGA50 & 13 \\ \hline
LA90 & 53 \\ \hline
LGA90 & 47 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
